LIBRARY RXASYNC INITINSTANCE LONGNAMES
PROTMODE
DESCRIPTION 'RXASYNC Utilities - (C) Copyright Crucial Applications 1994'
DATA MULTIPLE NONSHARED
STACKSIZE 32768
EXPORTS
     RXASYNCDROPFUNCS       = RxAsyncDropFuncs       @1
     RXASYNCLOADFUNCS       = RxAsyncLoadFuncs       @2
     RXASYNCPRIORITY        = RxAsyncPriority        @3
     RXASYNCSLEEP           = RxAsyncSleep           @4
     RXASYNCGETDCBINFO      = RxAsyncGetDcbInfo      @5
     RXASYNCSETDCBINFO      = RxAsyncSetDcbInfo      @6
     RXASYNCGETENHPARM      = RxAsyncGetEnhParm      @7
     RXASYNCSETENHPARM      = RxAsyncSetEnhParm      @8
     RXASYNCGETLNCTRL       = RxAsyncGetLnCtrl       @9
     RXASYNCSETLNCTRL       = RxAsyncSetLnCtrl       @10
     RXASYNCSETBREAKOFF     = RxAsyncSetBreakOff     @11
     RXASYNCSETBREAKON      = RxAsyncSetBreakOn      @12
     RXASYNCTXIMMEDIATE     = RxAsyncTxImmediate     @13
     RXASYNCTXSTOP          = RxAsyncTxStop          @14
     RXASYNCTXSTART         = RxAsyncTxStart         @15
     RXASYNCGETCOMSTATUS    = RxAsyncGetComStatus    @16
     RXASYNCGETTXSTATUS     = RxAsyncGetTxStatus     @17
     RXASYNCGETMDMOUTPUT    = RxAsyncGetMdmOutput    @18
     RXASYNCSETMDMOUTPUT    = RxAsyncSetMdmOutput    @19
     RXASYNCGETMDMINPUT     = RxAsyncGetMdmInput     @20
     RXASYNCGETRXCOUNT      = RxAsyncGetRxCount      @21
     RXASYNCGETTXCOUNT      = RxAsyncGetTxCount      @22
     RXASYNCGETCOMERROR     = RxAsyncGetComError     @23
     RXASYNCGETCOMEVENT     = RxAsyncGetComEvent     @24
     RXASYNCOPEN            = RxAsyncOpen            @25
     RXASYNCCLOSE           = RxAsyncClose           @26
     RXASYNCWAIT            = RxAsyncWait            @27
     RXASYNCREAD            = RxAsyncRead            @28
     RXASYNCWRITE           = RxAsyncWrite           @29
     RXASYNCPRINT           = RxAsyncPrint           @30
     RXASYNCCARRIER         = RxAsyncCarrier         @31
     RXASYNCBREAK           = RxAsyncBreak           @32
     RXASYNCDCBINFO         = RxAsyncDcbInfo         @33
     RXASYNCFILEEXISTS      = RxAsyncFileExists      @34
     RXASYNCFILEDELETE      = RxAsyncFileDelete      @35
     RXASYNCFILECOPY        = RxAsyncFileCopy        @36
     RXASYNCFILEMOVE        = RxAsyncFileMove        @37
     RXASYNCFILERENAME      = RxAsyncFileRename      @38
     RXASYNCFILENAMEIS      = RxAsyncFileNameIs      @39
     RXASYNCFILEPATHIS      = RxAsyncFilePathIs      @40
     RXASYNCDIRECTORY       = RxAsyncDirectory       @41
     RXASYNCMSGBOX          = RxAsyncMsgBox          @42
     RXASYNCWATCH           = RxAsyncWatch           @43
     RXASYNCFLUSHINPUT      = RxAsyncFlushInput      @44
     RXASYNCFLUSHOUTPUT     = RxAsyncFlushOutput     @45
     RXASYNCACTIVE          = RxAsyncActive          @46
     RXASYNCRAISE           = RxAsyncRaise           @47
     RXASYNCLOWER           = RxAsyncLower           @48
